2.15 2.2 2.25 2.3 2.35 2.4

)^2c

) (GeV/ S 0 (pK M 50 100 150 200 250 300

2c Entries per 12.0 MeV/

2c 0.003 GeV/ ± = 2.285 μ , fixed to MC 2c = 0.011 GeV/ σ 31 ± ) = 155 σ3±S(

+ c.c. S 0 pK → ^+_cΛ

= 5.02 TeV s ALICE pp, c < 12 GeV/ Tp 8 <

ALI-PUB-499690

ALI-PUB-499690